Title: Diagnose clutch linkage, cables, levers, brackets, bushings, pivots, springs, and clutch safety switch.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Clutch

Diagnosis should include

- identifying the linkage for wear and the cables for fraying
- locating missing or broken springs
- determining whether the vehicle will start without the clutch pedal depressed
- checking clutch release for stick or bind
- performing any needed action and repair or replace as needed.

ASE 2: II. Drive Train: B. Clutch (P-1)

Process/Skill Questions:

- What are the manufacture-free travel guidelines?
- What is the purpose of the clutch safety switch?
- Where are the lube points on the clutch system?
- What is the purpose of the clutch inspection cover?