Title: Diagnose the hydraulic clutch slave and master cylinders, lines, and hoses.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Clutch

Diagnosis should include

- fluid leaks
- proper fluid levels
- the condition of lines and hoses
- proper operation of clutch release valve, as applicable
- performing any needed action.

ASE 2: II. Drive Train: B. Clutch (P-1)

Process/Skill Questions:

- What would occur if the system were low on hydraulic fluid?
- How does one know when the hydraulic fluid is contaminated?
- What results can be expected when air is allowed into any hydraulic system?