Title: (Optional) Correct the system lubricant level when replacing the evaporator, condenser, receiver/drier or accumulator/drier, and hoses. (EPA 609 required)
Course: Diesel Equipment Technology III (20107-III) > Section: HVAC: Servicing the Evaporator, Condenser, and Related Components

Correction should include determining the amount of oil removed during the recovery process.

ASE 3: I. Diesel Engines: D. Lubrication Systems (P-1)

Process/Skill Questions:

- How is oil added into the system before it is closed?
- How is oil added into a closed system?