Title: Inspect the switches, sensors, controls, actuator components, and circuits.
Course: Diesel Equipment Technology III (20107-III) > Section: Diesel Engines: Servicing the Electronic Fuel Management System

Inspection should include

- locating the test and operational specifications for all electrical components in the manufacture service literature
- using a DMM or other testing devices to evaluate the components against the standard operating specifications
- making adjustments or replacements, as needed.

ASE 2: V. Electrical/Electronic Systems: F. Instrument Cluster and Driver Information Systems (P-2)

Process/Skill Questions:

- What basic troubleshooting skills and procedures are used in evaluating all the electrical components?
- When are electrical components serviceable?