Title: Identify product expiration dates as applicable.
Course: Collision Repair Technology III (20117-III)

Identification should include following the shelf life for manufacturer products.

Process/Skill Questions:

- Why is it important to rotate stock?
- What is the outcome of using out-of-date products?