Title: Explain safety hazards related to electric vehicles (EVs).
Course: Collision Repair Technology III (20117-III) > Section: Practicing Safety

Explanation should include following original equipment (OE) guidelines and procedures and

- using required PPE (e.g., properly rated gloves and boots)
- identifying high-voltage wires
- identifying battery shut-off switch.

Process/Skill Questions:

- How should the battery be removed and stored?
- What are the risks if one fails to use appropriately rated PPE?
- How should a damaged battery be disposed of?