Title: (Optional) Prepare an electrical schematic.
Course: Drafting, Advanced (21102-IV) > Section: Performing Mechanical Drafting and Design Operations with Extensive Use of CADD

Preparation should include

- choosing a sheet size
- choosing to draw the schematic to scale or not to scale
- centering the drawing on the sheet
- laying out the schematic with proper line weights and notes
- adding a legend to identify the symbols.

Process/Skill Questions:

- Why is scale not as important for electrical schematics as it is for other working drawings?
- Why are varied line weights used for schematics?