Title: Replace damaged structural components.
Course: Auto Body Technology III (20117_III) > Section: Analyzing Frame Damage and Repair

Replacement should include

- identifying the damaged structural components
- explaining the attachment type and location
- performing the adhesive or resistance spot weld
- using tools needed for removal and replacement
- using original equipment body repair manuals for sectioning and replacement
- following OE manufacturer guidelines and recommendations.

Process/Skill Questions:

- What method should be used to remove a welded structural component?
- How would one remove and install an adhesive-mounted structural component?