Title: Analyze misaligned or damaged steering, suspension, and powertrain mounting points.
Course: Auto Body Technology III (20117_III) > Section: Analyzing Frame Damage and Repair

Analysis should include

- using a three-dimensional (3D) measuring system (i.e., mechanical, electronic, or laser).
- knowing how a universal measuring system works
- knowing where and how to attach the targets for proper reading
- following OE manufacturer repair procedures and position statements and/or product manufacturer recommendations.

Process/Skill Questions:

- What equipment is used to identify misaligned or damaged steering, suspension, and powertrain mounting points? \
- What are some safety concerns of a damaged or misaligned steering suspension?