Title: Analyze, straighten and align mash and/or collapse damage.
Course: Auto Body Technology III (20117_III) > Section: Analyzing Frame Damage and Repair

Analysis should include the

- type of damage, as determined by measuring the damaged area
- attachment site and the direction of pull for proper alignment of the damaged area
- inspection of sheet metal alignment

following manufacturer guidelines and recommendations.

Process/Skill Questions:

- What method should be used for measuring?
- Where is the attachment site to straighten damage?