Title: (Optional) Pass an Environmental Protection Agency (EPA) 6H certification.
Course: Auto Body Technology III (20117_III) > Section: Practicing Safety

Student must pass an EPA 6H certification.

Process/Skill Questions:

- What are government agencies that enforce safety in the auto body field?
- How long is the certification valid?