Title: Use proper body mechanics when performing job functions.
Course: Patient Care Technician (14051-III) > Section: Practicing Safety Protocols

Use should include the following:

- Transport patients/clients using proper body mechanics.
- Transfer patients/clients using proper body mechanics.
- Transfer patients/clients using task-appropriate lifting equipment in accordance with National Institute for Occupational Safety and Health (NIOSH) guidelines.
- Manually lift and transfer patients/clients.

Process/Skill Questions:

- What is the correct technique for lifting a load?
- What is the number one injury among healthcare workers?