Title: Perform passive range of motion (ROM) for the patient.
Course: Patient Care Technician (14051-III) > Section: Preventing Medical Complications

Performance should include an understanding

- that range of motion (ROM) is the normal movement of a joint
- that ROM exercises should be performed five times each and at least twice a day.

Process/Skill Questions:

- When should ROM be performed?
- What is the point of resistance?