Title: Prepare a sample application and associated forms for licensure.
Course: Respiratory Therapy II (14061-II) > Section: Exploring Careers in Respiratory Therapy

Preparation for new graduates should include

- completing a sample application (VDHP application for respiratory therapy is an online application)
- any other documentation pertaining to criminal history, if necessary
- proof of national certification from NBRC.

Forms and applications for respiratory therapists are available from the Virginia Department of Health Professions (http://www.dhp.virginia.gov/medicine/medicine_forms.htm#RespiratoryCarePractitioner).

Process/Skill Questions:

- Where would you submit forms once they are complete?
- What is the cost to apply for licensure?
- What forms would need to be notarized?
- What types of crimes would prevent you from obtaining certification or licensure?