Title: Inspect, remove, and/or replace strut cartridge or assembly; inspect mounts and bushings.
Course: Automotive Technology I (20104-I) > Section: Suspension and Steering Systems: Related Suspension and Steering Service

Inspection should be conducted visually, according to state inspection procedures, using specialized tools according to manufacturer guidelines.

Process/Skill Questions:

- What is a strut compressor?
- What safety precautions should be taken to protect the technicians and the spring when compressing the spring?
- When should the upper strut bearing mount be checked? Explain.