Title: Protect electronics during welding procedures.
Course: Collision Repair Technology I (21117-I) > Section: Practicing Metal Welding, Cutting, and Joining

Protection should include

- using spark deflection paper
- using welding aprons and blankets
- using a surge protector during the process
- following OE guidelines and recommendations.

Process/Skill Questions:

- What should be done to protect electronic components when welding?
- Why are electronics vulnerable to damage?
- What problems can be encountered when disconnecting battery cables?
- What is available to alleviate problems associated with disconnecting battery cables?