Title: Create a written estimate of repairs.
Course: Collision Repair Technology I (21117-I) > Section: Preparing for Non-Structural Analysis and Damage Repair

Creation should include

- using an estimating software tool
- mapping out the repair plan
- calculating price based on repairs, parts, materials
- completing all data in a logical sequence
- writing legibly or recording digitally
- communicating information to the customer.

Process/Skill Questions:

- What is the purpose of providing a written estimate?
- What constitutes a total-loss vehicle?
- What is the difference between OE and aftermarket manufacturing processes and quality?