Title: Inspect, remove, protect, label, store, and reinstall vehicle mechanical and electrical components that may interfere with or be damaged during repair.
Course: Collision Repair Technology I (21117-I) > Section: Preparing for Non-Structural Analysis and Damage Repair

Procedures should include

- inspecting, testing, replacing, and aiming
  - fusible links, circuit breakers, and fuses
  - switches, relays, bulbs, sockets, connectors, and wires of all light circuits, including four-wire tail lamp or light systems
  - head lamp or light bulbs
- identifying programmable electrical/electronic components
- recording data for reprogramming before disconnecting a battery
- demonstrating self-grounding procedures for handling electrical components
- removing, replacing, and checking operation of
  - head lamp or light
  - parking or tail lamp or light
  - stop lamp or light
  - flashers
  - turn signals
  - backup lamp or light
  - Advance Driver Assist Systems (ADAS)
- protecting exposed connectors
- following OE guidelines and recommendations.

Process/Skill Questions:

- What mechanical and electrical belt components are driven by the serpentine?
- How is radiator coolant handled safely?
- How often should component reservoir tanks (plastic) be replaced?
- What is the result if a component is accidentally dropped?