Title: Perform lock-up converter system tests; determine the needed action.
Course: Automotive Technology III (20104-III) > Section: AUTOMATIC TRANSMISSION AND TRANSAXLE: General-Transmission and Transaxle Diagnosis

Procedures should include using service information to test and repair the torque converter lock-up system.

Process/Skill Questions:

- What are some causes of torque converter clutch (TCC) failure?
- What test equipment should be used?
- What repair procedures should be used?