Title: Use proper ventilation procedures for working in the lab area.
Course: Automotive Technology III (20104-III) > Section: REQUIRED SUPPLEMENTAL TASKS: Practicing Safety

Use should include

- keeping bay doors open when possible
- operating shop exhaust fans
- using an exhaust ventilation hose on running vehicles.

Process/Skill Questions:

- What are the gases emitted by a running vehicle?
- Why is proper ventilation so important?
- What are the dangers of running a vehicle engine in a confined space?