Title: Inspect the evaporator housing water drain; determine the needed action.
Course: Automotive Technology III (20104-III) > Section: HEATING, VENTILATION, AND AIR CONDITIONING (HVAC): Refrigeration System Component Diagnosis and Repair

Procedure should include

- ensuring water drips from the water drain as the AC system operates
- cleaning, if necessary.

Process/Skill Questions:

- How does the water drain?
- Where is the drain located?
- What happens when the drain is restricted?