Title: Check and adjust the clutch master cylinder fluid level; check for leaks; use the proper fluid type per manufacturer specification.
Course: Automotive Technology III (20104-III) > Section: MANUAL DRIVE TRAIN AND AXLES: Clutch Diagnosis and Repair

Procedure should include checking for leaks and proper operation and repairing or replacing as necessary.

Process/Skill Questions:

- What type of fluid goes into a hydraulic clutch system?
- What are failures of a hydraulic clutch system?
- How are internal and external fluid leaks checked?