Title: Inspect, test, adjust, repair, and/or replace electrical/electronic components and circuits.
Course: Automotive Technology III (20104-III) > Section: AUTOMATIC TRANSMISSION AND TRANSAXLE: In-Vehicle Transmission/Transaxle Maintenance and Repair

Procedures should include using a scan tool, digital multimeter (DMM), or test light to inspect and test electronic components such as

- computers
- solenoids
- sensors
- relays
- terminals
- connectors
- switches
- harnesses

and, if necessary, replace them. Students should also demonstrate an understanding of the relearn procedure.

Process/Skill Questions:

- What tools are used to inspect, test, and diagnose problems with electrical/electronic components?
- What are the procedures for checking shift solenoids?
- What are some failures of relays, switches, and harnesses?