Title: Perform oil pressure tests; determine the needed action.
Course: Automotive Technology III (20104-III) > Section: ENGINE REPAIR: Lubrication and Cooling Systems Diagnosis and Repair

Performance should include

- conducting a visual inspection
- using the mechanical oil pressure gauge
- following manufacturer guidelines.

Process/Skill Questions:

- When should an oil pressure test be performed?
- What can the result be from vehicles that continue to operate with low oil pressure?
- Where does the oil pressure gauge attach to the engine?