Title: Distinguish between an R-22 and an R-410A system and the requirements of each.
Course: Heating, Ventilation, Air Conditioning, and Refrigeration II (17056-II) > Section: Exploring R-410A

Distinction should include

- pressure
- temperature
- color of labeling
- gauges.

Process/Skill Questions:

- Why was R-410A developed?
- What are the safety aspects of R-410A?
- What tools are associated with R-410A?
- How does R-410A affect the environment?