Title: Identify heating, ventilation, and air conditioning (HVAC) components and configuration.
Course: Automotive Technology II (20104-II) > Section: Heating, Ventilation, and Air Conditioning (HVAC): General

Identification should include components (i.e., HVAC actuators, heater core, evaporator core, condenser, compressor).

Process/Skill Questions:

- How does a heater core function?
- What should the technician do if the air conditioning (A/C) is blowing warm?
- Are actuators vacuum- or electrically controlled?