Title: Confirm the proper battery capacity, size, type, and application for a vehicle; perform battery capacity and load test; determine the necessary action.
Course: Automotive Technology II (20104-II) > Section: Electrical/Electronic Systems: Battery Service

Procedure should include

- identifying the type of battery (absorbed glass mat, gel, maintenance-free, flooded/wet lead-acid)
- exploring the load and high-rate discharge
- referring to service materials and manufacturer guidelines.

Process/Skill Questions:

- Where is the cold cranking amperage (CCA) rating found?
- Should a frozen battery be tested? Why or why not?
- What tools are used to perform the battery capacity test?