Title: Inspect, remove, and replace the water pump.
Course: Automotive Technology II (20104-II) > Section: Engine Repair: Lubrication and Cooling Systems Diagnosis and Repair

Procedure should include following manufacturer guidelines.

Process/Skill Questions:

- How should a technician inspect a water pump? How often should it be inspected?
- What are the procedures to replace a water pump?
- What precautions should be taken when replacing a water pump?