Title: Check power doors.
Course: Auto Body Technology I (21117-I) > Section: Repairing the Outer Body Panel

Checking should include

- sensor function and operation
- pre- and post-repair operations.

Process/Skill Questions:

- What is the importance of calibrating?
- When is it necessary to recalibrate?