Title: Inspect spray guns and related equipment.
Course: Auto Body Technology II (20117-II) > Section: Operating Spray-Gun and Related Equipment

Inspection should include

- determining the type of spray gun in use
- determine the condition of the spray gun and related equipment, such as air hoses, regulators, air lines, air source, spray environment, and fillers
- cleaning spray guns after each use
- following equipment manufacturer guidelines and recommendations.

Process/Skill Questions:

- How is the pattern on a spray gun determined?
- What effect does the air hose have on air pressure?
- Why is it important to keep spray equipment clean?
- What are the different types of spray guns in use?
- What does CFM stand for?