Title: Inspect and replace the power steering hoses and fittings.
Course: Automotive Technology I (MLR 3-Year Program) (20104-IA) > Section: Suspension and Steering Systems: Related Suspension and Steering Service

Procedure should include conducting a visual inspection and using hand tools.

Process/Skill Questions:

- When should a hose be replaced?
- What is the best wrench to use on hydraulic fittings?
- Why is it important to use swage fittings on power steering lines?