Title: Analyze schemes for protection and management of pipelines.
Course: Energy and Power (20101-18) > Section: Transmitting Electricity

Analysis should include

- right-of-way management
- reliability and security organizations and regulatory bodies.

Process/Skill Questions:

- What threats are there to the distribution of natural gas?
- How are pipelines maintained?